/*
 Navicat Premium Data Transfer

 Source Server         : 192.168.124.46
 Source Server Type    : MySQL
 Source Server Version : 80030
 Source Host           : 192.168.124.46:3306
 Source Schema         : share_platform

 Target Server Type    : MySQL
 Target Server Version : 80030
 File Encoding         : 65001

 Date: 01/12/2022 18:12:20
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sys_notice_management
-- ----------------------------
DROP TABLE IF EXISTS `sys_notice_management`;
CREATE TABLE `sys_notice_management`  (
  `id` bigint(0) NOT NULL,
  `content` longtext CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL,
  `publish_time` datetime(0) NULL DEFAULT NULL,
  `del_flag` int(0) NULL DEFAULT NULL,
  `create_date` datetime(0) NULL DEFAULT NULL,
  `creator` bigint(0) NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
