SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;
-- ----------------------------
-- Table structure for t_ucs_lc_dept_rel
-- ----------------------------
DROP TABLE IF EXISTS `t_ucs_lc_dept_rel`;
CREATE TABLE `t_ucs_lc_dept_rel`  (
  `ucs_id` bigint(0) NOT NULL COMMENT 'ucs部门ID，sys_dept主键',
  `ucs_name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT 'ucs部门名称',
  `district` bigint(0) NULL DEFAULT NULL COMMENT '部门所属地区',
  `district_name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '地区名称',
  `type` int(0) NULL DEFAULT NULL COMMENT '部门类型',
  `lc_name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '浪潮部门名称',
  `lc_id` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '浪潮部门ID'
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = 'ucs与浪潮部门名称对应表' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
