ALTER TABLE `tb_fuse`
MODIFY COLUMN `description` varchar(1000) DEFAULT NULL COMMENT '融合服务描述',
DROP COLUMN `dept_user`,
DROP COLUMN `mobile`,
DROP COLUMN `provider`,
DROP COLUMN `provider_user`,
DROP COLUMN `provider_mobile`;

ALTER TABLE `tb_fuse_resource`
ADD COLUMN `type` varchar(128) NULL COMMENT '资源类型';