DROP TABLE IF EXISTS `t_api_count_history`;
CREATE TABLE `t_api_count_history`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `version` bigint COMMENT '数据版本号，从0递增',
  `current_count`bigint  COMMENT '当前总数，只有最新一条有效',
  `history_count`bigint  COMMENT '保存历史重启的数量',
  `create_time` datetime NULL DEFAULT NULL,
  `update_time` datetime NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB COMMENT = '网关历史调用总数';
