REPLACE INTO `sys_user`(`id`, `username`, `password`, `real_name`, `head_url`, `gender`, `email`, `mobile`, `dept_id`, `super_admin`, `status`, `creator`, `create_date`, `updater`, `update_date`, `guid`) VALUES (1067246875800000001, 'admin', '$2a$10$012Kx2ba5jzqr9gLlG4MX.bnQJTD9UWqF57XDo2N3.fPtLne02u/m', '管理员', NULL, 0, 'root@renren.io', '13612345678', NULL, 1, 1, 1067246875800000001, '2022-01-08 09:18:30', 1067246875800000001, '2022-01-08 09:18:30', NULL);
