ALTER TABLE `tb_fuse_resource` ADD COLUMN `type` int NULL DEFAULT 0 COMMENT '资源类型';
ALTER TABLE `tb_fuse_resource` ADD COLUMN `dept_name` int NULL DEFAULT 0 COMMENT '部门名称';
ALTER TABLE `tb_fuse_resource` ADD COLUMN `resource_name` int NULL DEFAULT 0 COMMENT '资源名称';