ALTER TABLE `tb_fuse` ADD COLUMN `infrastructure_count` int NULL DEFAULT 0 COMMENT '基础设施数量';
ALTER TABLE `tb_fuse` ADD COLUMN `data_source_count` int NULL DEFAULT 0 COMMENT '数据资源数量';
ALTER TABLE `tb_fuse` ADD COLUMN `component_count` int NULL DEFAULT 0 COMMENT '组件服务数量';